9,9; 10,05; 9,65; 10,475; 10,075; 10,7; 9,4; 10,8; 10,3; 9,875; 10,225; 9,65; 10,8; 9,725; 11,025; 10,875; 9,375; 9,275; 9,825; 10,325; 9,925; 10,375; 10,475; 9,725; 9,45; 10,65; 10,1%
